%! lualatex mal-xlop.tex
\documentclass[varwidth,border={0 0 0 2pt}]{standalone}
\usepackage{xlop}
\begin{document}
\opdiv[style=text]{124}{7},\qquad\opidiv[style=text]{124}{7},\qquad \opdiv[period,style=text,equalsymbol=$\approx$,hrulewidth=0.5pt, vruleperiod=0.7]{150}{7}\par\medskip\hfil\opadd{012.3427}{5.2773}
\qquad\opmul[displayshiftintermediary=all]{453}{1001205}
\end{document}